Jimmy(LO*) Prof.

Jimmy(LO*) MC09

Pythia6(CTEQ5L) Prof.

data 10^{−3}

10^{−2}

10^{−1}110^110^210^3p^⊥ in MAX+MIN trans. cones (40 < E^{lead}⊥ < 80 GeV, √ s=1.8 TeV) dσ/dp_⊥01020304050607080900.60.811.21.4 p_⊥ / GeV

MC/data